-8 -7 -6 -5 -4 -3 -2 -1 0 2 4 6 8 10 0-5 %

-8 -7 -6 -5 -4 -3 -2 -1 0

/2)〉

part

N〈/( η

/d_{ch}Nd

2 4 6 8 10 10-20 %^{Double Gaussian fit}

Linear extrapolation

beam

y-η ='η

-8 -7 -6 -5 -4 -3 -2 -1 0 0 2 4 6 8 10^{ALICE 2.76 TeV}

BRAHMS Si 200 GeV BRAHMS BB 200 GeV PHOBOS 200 GeV PHOBOS 62 GeV

20-30 %